Time (sec.)

Amplitude

Step Response

0 5 10 -1 -0.5 0 0.5 1 1.5 2 From: U(1)

To: Y(1)

Time (sec.)

Step Response

0 5 10 -1 -0.5 0 0.5 1 1.5 2 From: U(1)

Time (sec.)

Step Response

0 5 10 -1 -0.5 0 0.5 1 1.5 2 From: U(1)

Time (sec.)

Step Response

0 5 10 -1 -0.5 0 0.5 1 1.5 2 From: U(1)

Time (sec.)

Step Response

0 5 10 -1 -0.5 0 0.5 1 1.5 2 From: U(1)

Time (sec.)

Step Response

0 5 10 -1 -0.5 0 0.5 1 1.5 2 From: U(1)